1965 1966 1967 1968 1969 1970 1971 1972 1973 1974 1975 1976 1977 0

5

10

15

20 water depth (cm)

1978 1979 1980 1981 1982 1983 1984 1985 1986 1987 1988 1989 0

5

10

15

20 water depth (cm)

Mean daily water depth (cm) over ATLSS study area (1966-1989)